\begin{tabular}{rrrrrr}
\toprule
Capacity & Slots & LRU & Static-freq. & Hybrid & Analytic \\
\midrule
2.0\%$^\dagger$ & 20 & 0.0\% & 6.2\% & 4.9\% & 6.2\% \\
5.0\%$^\dagger$ & 51 & 0.0\% & 13.5\% & 10.6\% & 13.5\% \\
10.0\%$^\dagger$ & 102 & 0.0\% & 22.9\% & 18.4\% & 22.9\% \\
12.5\% & 128 & 25.3\% & 27.1\% & 21.9\% & 27.1\% \\
15.0\% & 153 & 37.0\% & 31.0\% & 24.9\% & 31.0\% \\
25.0\% & 256 & 48.4\% & 45.1\% & 38.2\% & 45.1\% \\
40.0\% & 409 & 66.0\% & 62.4\% & 67.3\% & 62.4\% \\
60.0\% & 614 & 83.6\% & 80.6\% & 84.7\% & 80.6\% \\
80.0\% & 819 & 96.0\% & 93.9\% & 95.9\% & 93.9\% \\
\bottomrule
\end{tabular}